<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.4.0">
<drawing>
<board>
<plain>
<text>2 SERVOS</text>
<wire x1="29.591" y1="-0.635" x2="29.591" y2="28.956" width="0.254" layer="20"/>
<wire x1="29.591" y1="28.956" x2="-0.381" y2="28.956" width="0.254" layer="20"/>
<wire x1="-0.381" y1="28.956" x2="-0.381" y2="-0.635" width="0.254" layer="20"/>
<wire x1="-0.381" y1="-0.635" x2="29.591" y2="-0.635" width="0.254" layer="20"/>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="C1206FAB">
</package>
<package name="SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="2X03SMD">
</package>
<package name="R1206FAB">
</package>
<package name="EFOBM">
</package>
<package name="SOT223">
<description>&lt;b&gt;SOT-223&lt;/b&gt;</description>
</package>
<package name="2X02SMD">
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="fab" package="C1206FAB" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="ATTINY44" library="fab" package="SOIC14" value="ATTINY44-SSU">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP1-2SERVOS" library="fab" package="2X03SMD" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="fab" package="R1206FAB" value="10K">
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="EFOBM" value="RESONATOR"/>
<element name="VOLTAGE-REGULATOR" library="fab" package="SOT223" value="">
<attribute name="NAME"/>
<attribute name="PROD_ID" value="VREG-08170"/>
<attribute name="VALUE"/>
</element>
<element name="JP2-ISP" library="fab" package="2X03SMD" value="">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="REGULATOR" library="fab" package="2X02SMD" value="PINHD-2X2-SMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="SERIAL_TX_RX" library="fab" package="2X02SMD" value="PINHD-2X2-SMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="S1">
<contactref element="JP1-2SERVOS" pad="1"/>
<contactref element="ATTINY44" pad="6"/>
</signal>
<signal name="MOSI">
<contactref element="JP2-ISP" pad="3"/>
<contactref element="ATTINY44" pad="7"/>
<contactref element="JP1-2SERVOS" pad="2"/>
</signal>
<signal name="RESET">
<contactref element="JP2-ISP" pad="2"/>
<contactref element="ATTINY44" pad="4"/>
<contactref element="R1" pad="1"/>
</signal>
<signal name="MISO">
<contactref element="JP2-ISP" pad="6"/>
<contactref element="ATTINY44" pad="8"/>
</signal>
<signal name="SCK">
<contactref element="JP2-ISP" pad="4"/>
<contactref element="ATTINY44" pad="9"/>
</signal>
<signal name="XTAL2">
<contactref element="ATTINY44" pad="3"/>
<contactref element="U$1" pad="3"/>
</signal>
<signal name="VCC">
<contactref element="ATTINY44" pad="1"/>
<contactref element="C1" pad="2"/>
<contactref element="R1" pad="2"/>
<contactref element="JP2-ISP" pad="5"/>
<contactref element="JP1-2SERVOS" pad="3"/>
<contactref element="JP1-2SERVOS" pad="4"/>
<contactref element="VOLTAGE-REGULATOR" pad="2"/>
<contactref element="VOLTAGE-REGULATOR" pad="4"/>
<contactref element="SERIAL_TX_RX" pad="3"/>
</signal>
<signal name="GND">
<contactref element="ATTINY44" pad="14"/>
<contactref element="C1" pad="1"/>
<contactref element="U$1" pad="2"/>
<contactref element="JP2-ISP" pad="1"/>
<contactref element="JP1-2SERVOS" pad="5"/>
<contactref element="JP1-2SERVOS" pad="6"/>
<contactref element="VOLTAGE-REGULATOR" pad="1"/>
<contactref element="REGULATOR" pad="4"/>
</signal>
<signal name="XTAL1">
<contactref element="U$1" pad="1"/>
<contactref element="ATTINY44" pad="2"/>
</signal>
<signal name="V">
<contactref element="VOLTAGE-REGULATOR" pad="3"/>
<contactref element="REGULATOR" pad="1"/>
<contactref element="REGULATOR" pad="2"/>
</signal>
<signal name="RX">
<contactref element="ATTINY44" pad="10"/>
<contactref element="SERIAL_TX_RX" pad="1"/>
</signal>
<signal name="TX">
<contactref element="ATTINY44" pad="11"/>
<contactref element="SERIAL_TX_RX" pad="2"/>
</signal>
<signal name="N$1">
<contactref element="REGULATOR" pad="3"/>
</signal>
<signal name="N$3">
<contactref element="SERIAL_TX_RX" pad="4"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
