<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.4.1">
<drawing>
<board>
<plain>
<wire x1="5.08" y1="36.83" x2="56.82" y2="36.83" width="0.3048" layer="20"/>
<wire x1="56.82" y1="36.83" x2="56.82" y2="69.84" width="0.3048" layer="20"/>
<wire x1="56.82" y1="69.84" x2="5.08" y2="69.84" width="0.3048" layer="20"/>
<wire x1="5.08" y1="69.84" x2="5.08" y2="36.83" width="0.3048" layer="20"/>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="C1206FAB">
</package>
<package name="SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="SOT23">
<description>&lt;b&gt;SOT 23&lt;/b&gt;</description>
</package>
<package name="2X02SMD">
</package>
<package name="R1206FAB">
</package>
<package name="P-LCC-4">
<description>&lt;b&gt;Power TOPLED®&lt;/b&gt;&lt;p&gt;
Source: http://www.osram.convergy.de/ ... LA_LO_LA_LY E67B.pdf</description>
</package>
<package name="2X03SMD">
</package>
<package name="EFOBM">
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="fab" package="C1206FAB" value="1UF">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="IC1" library="fab" package="SOIC14" value="ATTINY44-SSU">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="IC2" library="fab" package="SOT23" value="5V">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="NET" library="fab" package="2X02SMD" value="PINHD-2X2-SMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="PWR" library="fab" package="2X02SMD" value="PINHD-2X2-SMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="fab" package="R1206FAB" value="10K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R2" library="fab" package="R1206FAB" value="1K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R3" library="fab" package="R1206FAB" value="1K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R4" library="fab" package="R1206FAB" value="499">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="RGB" library="fab" package="P-LCC-4" value="LEDRGBNEW">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="2X03SMD" value="AVRISPSMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="RGB2" library="fab" package="P-LCC-4" value="LEDRGBNEW">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R5" library="fab" package="R1206FAB" value="1K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R6" library="fab" package="R1206FAB" value="1K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R7" library="fab" package="R1206FAB" value="499">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$2" library="fab" package="EFOBM" value="RESONATOR"/>
</elements>
<signals>
<signal name="R">
<contactref element="R3" pad="2"/>
<contactref element="RGB" pad="R"/>
</signal>
<signal name="B">
<contactref element="R4" pad="2"/>
<contactref element="RGB" pad="B"/>
</signal>
<signal name="G">
<contactref element="R2" pad="2"/>
<contactref element="RGB" pad="G"/>
</signal>
<signal name="VCC">
<contactref element="IC2" pad="1"/>
<contactref element="U$1" pad="2"/>
<contactref element="IC1" pad="1"/>
<contactref element="NET" pad="1"/>
<contactref element="R1" pad="2"/>
<contactref element="C1" pad="1"/>
<contactref element="RGB" pad="A"/>
<contactref element="RGB2" pad="A"/>
</signal>
<signal name="V">
<contactref element="IC2" pad="2"/>
<contactref element="PWR" pad="1"/>
<contactref element="PWR" pad="3"/>
</signal>
<signal name="GND">
<contactref element="NET" pad="3"/>
<contactref element="IC1" pad="14"/>
<contactref element="U$1" pad="6"/>
<contactref element="IC2" pad="3"/>
<contactref element="C1" pad="2"/>
<contactref element="U$2" pad="2"/>
<contactref element="PWR" pad="2"/>
<contactref element="PWR" pad="4"/>
</signal>
<signal name="TX">
<contactref element="NET" pad="2"/>
<contactref element="IC1" pad="13"/>
</signal>
<signal name="RX">
<contactref element="NET" pad="4"/>
<contactref element="IC1" pad="12"/>
</signal>
<signal name="MISO">
<contactref element="IC1" pad="8"/>
<contactref element="R3" pad="1"/>
<contactref element="U$1" pad="1"/>
</signal>
<signal name="MOSI">
<contactref element="IC1" pad="7"/>
<contactref element="U$1" pad="4"/>
<contactref element="R2" pad="1"/>
</signal>
<signal name="SCK">
<contactref element="IC1" pad="9"/>
<contactref element="U$1" pad="3"/>
<contactref element="R6" pad="1"/>
</signal>
<signal name="PA3">
<contactref element="IC1" pad="10"/>
<contactref element="R5" pad="1"/>
</signal>
<signal name="PA2">
<contactref element="IC1" pad="11"/>
<contactref element="R7" pad="1"/>
</signal>
<signal name="RST">
<contactref element="IC1" pad="4"/>
<contactref element="U$1" pad="5"/>
<contactref element="R1" pad="1"/>
</signal>
<signal name="R1">
<contactref element="RGB2" pad="R"/>
<contactref element="R6" pad="2"/>
</signal>
<signal name="B1">
<contactref element="RGB2" pad="B"/>
<contactref element="R7" pad="2"/>
</signal>
<signal name="G1">
<contactref element="RGB2" pad="G"/>
<contactref element="R5" pad="2"/>
</signal>
<signal name="PB0">
<contactref element="U$2" pad="1"/>
<contactref element="IC1" pad="2"/>
</signal>
<signal name="PB1">
<contactref element="U$2" pad="3"/>
<contactref element="IC1" pad="3"/>
</signal>
<signal name="PA7">
<contactref element="IC1" pad="6"/>
<contactref element="R4" pad="1"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
