<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.3.1">
<drawing>
<board>
<plain>
<wire x1="0" y1="0" x2="75.545" y2="0.127" width="0" layer="20"/>
<wire x1="75.545" y1="0.127" x2="75.545" y2="49.835" width="0" layer="20"/>
<wire x1="75.545" y1="49.835" x2="0" y2="49.708" width="0" layer="20"/>
<wire x1="0" y1="49.708" x2="0" y2="0" width="0" layer="20"/>
<text>Lucas</text>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="C1206FAB">
</package>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="2X03SMD">
</package>
<package name="LED1206FAB">
<description>LED1206 FAB style (smaller pads to allow trace between)</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="EFOBM">
</package>
<package name="6MM_SWITCH">
<description>&lt;b&gt;OMRON SWITCH&lt;/b&gt;</description>
</package>
</packages>
</library>
<library name="MCU-ATMEGA328P-AU_TQFP32_">
<packages>
<package name="TQFP32-0.8-7X7MM">
<description>&lt;B&gt;Thin Plasic Quad Flat Package&lt;/B&gt; Grid 0.8 mm</description>
</package>
</packages>
</library>
<library name="pinhead">
<description>&lt;b&gt;Pin Header Connectors&lt;/b&gt;&lt;p&gt;
&lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
<package name="1X06">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X07">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X08">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="fab" package="C1206FAB" value="10uF">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="C4" library="fab" package="C1206" value="0.1uF">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="IC1" library="MCU-ATMEGA328P-AU_TQFP32_" package="TQFP32-0.8-7X7MM" value="MCU-ATMEGA328P-AU">
<attribute name="DESCRIPTION" value=" Microcontroller Mcu, 8 Bit, Atmega, 20mhz, Tqfp-32 "/>
<attribute name="DIGI-KEY_PART_NUMBER" value="ATMEGA328P-AU-ND"/>
<attribute name="DIGI-KEY_PURCHASE_URL" value="https://www.digikey.sg/product-detail/en/microchip-technology/ATMEGA328P-AU/ATMEGA328P-AU-ND/1832260?utm_source=snapeda&amp;utm_medium=aggregator&amp;utm_campaign=symbol"/>
<attribute name="MF" value="Microchip"/>
<attribute name="MP" value="ATMEGA328P-AU"/>
<attribute name="NAME"/>
<attribute name="PACKAGE" value="TQFP-32 Microchip"/>
<attribute name="VALUE"/>
</element>
<element name="ISP" library="fab" package="2X03SMD" value="AVR ISP">
<attribute name="VALUE"/>
</element>
<element name="JP3" library="pinhead" package="1X06" value="GPIO/Analog">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="LED" library="fab" package="LED1206FAB" value="RED">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="fab" package="R1206" value="10K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R2" library="fab" package="R1206" value="1K">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="RESONATOR" library="fab" package="EFOBM" value="16Mhz">
<attribute name="16MHZ" value="16Mhz"/>
<attribute name="RESONATOR" value="RESONATOR"/>
</element>
<element name="SW1" library="fab" package="6MM_SWITCH" value="SW1">
<attribute name="NAME"/>
</element>
<element name="JP2" library="pinhead" package="1X07" value="I2C/Tx/Rx">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="JP1" library="pinhead" package="1X08" value="Power In/GPIO">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="VCC">
<contactref element="ISP" pad="2"/>
<contactref element="IC1" pad="4"/>
<contactref element="IC1" pad="6"/>
<contactref element="IC1" pad="18"/>
<contactref element="C1" pad="1"/>
<contactref element="C4" pad="2"/>
<contactref element="JP3" pad="1"/>
<contactref element="R1" pad="1"/>
<contactref element="JP2" pad="1"/>
<contactref element="JP1" pad="2"/>
<contactref element="JP1" pad="1"/>
</signal>
<signal name="MOSI">
<contactref element="ISP" pad="4"/>
<contactref element="IC1" pad="15"/>
</signal>
<signal name="GND">
<contactref element="ISP" pad="6"/>
<contactref element="IC1" pad="3"/>
<contactref element="IC1" pad="21"/>
<contactref element="IC1" pad="5"/>
<contactref element="JP3" pad="2"/>
<contactref element="C1" pad="2"/>
<contactref element="C4" pad="1"/>
<contactref element="LED" pad="2"/>
<contactref element="RESONATOR" pad="2"/>
<contactref element="SW1" pad="4"/>
<contactref element="SW1" pad="3"/>
<contactref element="JP2" pad="2"/>
<contactref element="JP1" pad="4"/>
<contactref element="JP1" pad="3"/>
</signal>
<signal name="MISO">
<contactref element="ISP" pad="1"/>
<contactref element="IC1" pad="16"/>
</signal>
<signal name="SCK">
<contactref element="ISP" pad="3"/>
<contactref element="IC1" pad="17"/>
</signal>
<signal name="RST">
<contactref element="ISP" pad="5"/>
<contactref element="SW1" pad="1"/>
<contactref element="SW1" pad="2"/>
<contactref element="R1" pad="2"/>
<contactref element="IC1" pad="29"/>
<contactref element="JP2" pad="5"/>
</signal>
<signal name="PC5_SCL">
<contactref element="IC1" pad="28"/>
<contactref element="JP2" pad="4"/>
</signal>
<signal name="PC4_SDA">
<contactref element="IC1" pad="27"/>
<contactref element="JP2" pad="3"/>
</signal>
<signal name="PC3">
<contactref element="IC1" pad="26"/>
<contactref element="JP3" pad="3"/>
</signal>
<signal name="PC1">
<contactref element="IC1" pad="24"/>
<contactref element="JP3" pad="5"/>
</signal>
<signal name="LED2">
<contactref element="R2" pad="2"/>
<contactref element="IC1" pad="32"/>
</signal>
<signal name="N$2">
<contactref element="R2" pad="1"/>
<contactref element="LED" pad="1"/>
</signal>
<signal name="XTAL2">
<contactref element="RESONATOR" pad="3"/>
<contactref element="IC1" pad="8"/>
</signal>
<signal name="XTAL1">
<contactref element="IC1" pad="7"/>
<contactref element="RESONATOR" pad="1"/>
</signal>
<signal name="PC2">
<contactref element="IC1" pad="25"/>
<contactref element="JP3" pad="4"/>
</signal>
<signal name="PD5">
<contactref element="IC1" pad="9"/>
<contactref element="JP1" pad="5"/>
</signal>
<signal name="PD6">
<contactref element="IC1" pad="10"/>
<contactref element="JP1" pad="6"/>
</signal>
<signal name="PD7">
<contactref element="IC1" pad="11"/>
<contactref element="JP1" pad="7"/>
</signal>
<signal name="PB0">
<contactref element="IC1" pad="12"/>
<contactref element="JP1" pad="8"/>
</signal>
<signal name="PC0">
<contactref element="IC1" pad="23"/>
<contactref element="JP3" pad="6"/>
</signal>
<signal name="RX">
<contactref element="IC1" pad="30"/>
<contactref element="JP2" pad="6"/>
</signal>
<signal name="TX">
<contactref element="IC1" pad="31"/>
<contactref element="JP2" pad="7"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
